Index: openacs-4/packages/acs-subsite/sql/oracle/tests/subsite-callbacks-test.sql
===================================================================
RCS file: /usr/local/cvsroot/openacs-4/packages/acs-subsite/sql/oracle/tests/subsite-callbacks-test.sql,v
diff -u -r1.1 -r1.2
--- openacs-4/packages/acs-subsite/sql/oracle/tests/subsite-callbacks-test.sql	5 Apr 2001 18:23:38 -0000	1.1
+++ openacs-4/packages/acs-subsite/sql/oracle/tests/subsite-callbacks-test.sql	30 Sep 2003 12:10:03 -0000	1.2
@@ -41,7 +41,7 @@
      raise_application_error(-20000,'Duplicate insert succeeded where it should have done nothing.');
   end if;
 
-  subsite_callback.delete(v_callback_id);
+  subsite_callback.del(v_callback_id);
 
   v_callback_id := subsite_callback.new(object_type=>'group',
                                         event_type=>'insert',
@@ -58,7 +58,7 @@
      raise_application_error(-20000,'Insert failed');
   end if;
 
-  subsite_callback.delete(v_callback_id);
+  subsite_callback.del(v_callback_id);
 
   select count(*) into v_count
     from subsite_callbacks
