Index: openacs-4/packages/wp-slim/sql/postgresql/wp-slim-drop.sql
===================================================================
RCS file: /usr/local/cvsroot/openacs-4/packages/wp-slim/sql/postgresql/wp-slim-drop.sql,v
diff -u -N -r1.3 -r1.3.2.1
--- openacs-4/packages/wp-slim/sql/postgresql/wp-slim-drop.sql	13 Mar 2002 22:50:53 -0000	1.3
+++ openacs-4/packages/wp-slim/sql/postgresql/wp-slim-drop.sql	2 Mar 2003 22:56:43 -0000	1.3.2.1
@@ -368,7 +368,7 @@
 --drop package wp_slide;
 DROP FUNCTION wp_slide__new(
 	integer,
-	timestamp,
+	timestamptz,
 	integer,
 	varchar,
 	varchar,
@@ -408,7 +408,7 @@
 
 --drop package wp_presentation;
 DROP FUNCTION wp_presentation__new(
-	timestamp,
+	timestamptz,
 	integer,
 	varchar,
 	varchar,
@@ -450,7 +450,7 @@
 );
 
 drop function wp_slide__new_revision(
-    timestamp,
+    timestamptz,
     integer,
     varchar,
     integer,
@@ -465,7 +465,7 @@
     boolean);
 
 drop function wp_presentation__new_revision (
-    timestamp,
+    timestamptz,
     integer,	 
     varchar,	 
     integer,	 
