Index: openacs-4/packages/logger/sql/oracle/logger-tables-drop.sql
===================================================================
RCS file: /usr/local/cvsroot/openacs-4/packages/logger/sql/oracle/logger-tables-drop.sql,v
diff -u -r1.2 -r1.3
--- openacs-4/packages/logger/sql/oracle/logger-tables-drop.sql	5 Apr 2003 13:10:13 -0000	1.2
+++ openacs-4/packages/logger/sql/oracle/logger-tables-drop.sql	6 Apr 2003 08:02:45 -0000	1.3
@@ -10,6 +10,14 @@
 
 drop table logger_measurements;
 
+begin
+    acs_object_type.drop_type (
+	'logger_measurement'
+    );
+end;
+/
+show errors
+
 drop table logger_projections;
 
 drop sequence logger_projections_seq;
